0000262,0000021
000018357,0000003,*HLP1                                             
000018431,0000003,*HLP2                                             
000018498,0000003,*HLP3                                             
000018564,0000003,*HLP4                                             
000018632,0000003,*HLP5                                             
000018704,0000003,*HLP6                                             
000018778,0000007,*HLP7                                             
000018959,0000009,*HLP11                                            
000019239,0000005,*HLP12                                            
000019382,0000004,*HLP13                                            
000019515,0000003,*HLP14                                            
000019588,0000003,*HLP15                                            
000019649,0000008,*HLP16                                            
000019816,0000007,*HLP17                                            
000019962,0000004,*HLP18                                            
000020049,0000004,*HLP19                                            
000020106,0000005,*HLP1A                                            
000020204,0000021,*HLP1B                                            
000020916,0000004,*HLP1C                                            
000021051,0000004,*HLP1D                                            
000021175,0000013,*HLP20                                            
000021516,0000004,*HLP21                                            
000021637,0000005,*HLP22                                            
000021781,0000003,*HLP23                                            
000021865,0000006,*HLP30                                            
000022049,0000007,*HLP31                                            
000022254,0000005,*HLP32                                            
000022363,0000002,*HLP33                                            
000022395,0000002,*HLP34                                            
000022428,0000002,*HLP35                                            
000022462,0000007,*HLP36                                            
000022635,0000004,*HLP37                                            
000022706,0000006,*HLP38                                            
000022842,0000002,*HLP39                                            
000022877,0000002,*HLP3A                                            
000022912,0000007,*HLP3B                                            
000023077,0000017,*HLP3C                                            
000023743,0000006,*HLP3D                                            
000023975,0000002,*HLP43                                            
000024010,0000010,*HLP51                                            
000024256,0000013,*HLP52                                            
000024627,0000007,*HLP53                                            
000024863,0000016,*HLP54                                            
000025256,0000010,*HLP55                                            
000025537,0000002,*HLP56                                            
000025572,0000002,*HLP60                                            
000025612,0000002,*HLP61                                            
000025645,0000002,*HLP62                                            
000025686,0000002,*HLP63                                            
000025727,0000002,*HLP64                                            
000025762,0000002,*HLP70                                            
000025796,0000002,*HLP71                                            
000025832,0000002,*HLP72                                            
000025861,0000006,*hMPMEMORYLOW                                     
000026091,0000004,*hMPSAVEFILE                                      
000026234,0000002,*hMPSAVECLIP                                      
000026284,0000002,*hMPUPDATEINI                                     
000026337,0000002,*hMPREADLINECLIP                                  
000026392,0000002,*hMPREADPAGECLIP                                  
000026446,0000002,*hMPREADELEMCLIP                                  
000026503,0000002,*hFNTALLHLP                                       
000026560,0000002,*hFNTCHHLP                                        
000026601,0000002,*hDISCHHLP                                        
000026652,0000002,*hDELBGALLHLP                                     
000026695,0000002,*hCOMMMOUSEHLP                                    
000026747,0000002,*hERRHLP0                                         
000026788,0000002,*hERRHLP1                                         
000026836,0000002,*hERRHLP2                                         
000026885,0000002,*hERRHLP3                                         
000026936,0000002,*hERRHLP4                                         
000026980,0000002,*hERRHLP5                                         
000027022,0000002,*hERRHLP6                                         
000027063,0000002,*hERRHLP7                                         
000027105,0000002,*hERRHLP8                                         
000027148,0000002,*hERRHLP9                                         
000027194,0000002,*hPANICSAVEHLP                                    
000027230,0000002,*hNOMOUSEHLP                                      
000027279,0000002,*hMOUSESETHLP                                     
000027322,0000002,*hNOCHHLP                                         
000027371,0000002,*hCHCOLHLP                                        
000027411,0000002,*hCHCHCHLP                                        
000027445,0000004,*hSHELLNOMEMHLP                                   
000027568,0000004,*hSHELLNOCOMMHLP                                  
000027701,0000004,*hQUITSAVEHLP                                     
000027830,0000002,*hQUITHLP                                         
000027875,0000002,*hCOLCOMBHLP                                      
000027927,0000002,*hFMNAMEHLP                                       
000027969,0000002,*hFMFILEHLP                                       
000028011,0000002,*hFMDIRHLP                                        
000028057,0000002,*hNEWOKHLP                                        
000028099,0000002,*hSAVEOVHLP                                       
000028143,0000002,*hDELOKHLP                                        
000028174,0000003,*hNOTIMPHLP                                       
000028258,0000002,*hPAGEASKNAMEHLP                                  
000028306,0000002,*hDELELEMHLP                                      
000028340,0000002,*hYESNOHLP                                        
000028369,0000002,*hINSDELHLP                                       
000028431,0000002,*hPREVHLP                                         
000028475,0000002,*hNEXTHLP                                         
000028515,0000002,*hNAMEHLP                                         
000028555,0000003,*hOKHELP                                          
000028605,0000003,*hCANCELHELP                                      
000028659,0000002,*hPAGENUM                                         
000028698,0000002,*hMPADDPAGE                                       
000028748,0000002,*hPAGEADDMSHLP                                    
000028782,0000002,*hPAGEDELHLP                                      
000028837,0000002,*hPAGEINSMHLP                                     
000028872,0000002,*hMPINSPAGE                                       
000028925,0000002,*hNODATEEDHLP                                     
000028974,0000002,*hNOTIMEEDHLP                                     
000029023,0000004,*hMAINPAGEHLP                                     
000029123,0000002,*hDBMENU                                          
000029151,0000002,*hDATMENU                                         
000029179,0000002,*hTIMMENU                                         
000029207,0000002,*hPUTMNU                                          
000029234,0000002,*hTXTMNU                                          
000029267,0000002,*hATTMENU                                         
000029300,0000002,*hEDITMNU                                         
000029328,0000002,*hDELMNU                                          
000029357,0000002,*hCUTMNU                                          
000029383,0000002,*hCOPMNU                                          
000029410,0000002,*hCOMHLP1                                         
000029446,0000002,*hCOMHLP2                                         
000029473,0000002,*hCOMHLP3                                         
000029498,0000002,*hCOMHLP4                                         
000029525,0000002,*hMOUSECOMHLP                                     
000029585,0000002,*hCOMPORTHLP                                      
000029625,0000002,*hNROFSTHLP                                       
000029664,0000002,*hPARITYHLP                                       
000029700,0000002,*hBAUDHLP                                         
000029738,0000002,*hHLPOFHLP                                        
000029769,0000002,*hPRINTPAUSE                                      
000029805,0000002,*hPRINTERR                                        
000029849,0000002,*hPRINTTERM                                       
000029889,0000002,*hAPLNAME                                         
000029923,0000002,*hLPTCHHLP                                        
000029973,0000002,*hPRFOOT                                          
000030004,0000002,*hPRLENGT                                         
000030042,0000002,*hPRDEST                                          
000030078,0000002,*hPRDRIV                                          
000030109,0000002,*hPRFROM                                          
000030141,0000002,*hPRTOPAG                                         
000030172,0000002,*hPRNCHHLP                                        
000030216,0000002,*hCHOSEDESTHLP                                    
000030266,0000002,*hWRONGDISHLP                                     
000030308,0000002,*hWRONGMEMHLP                                     
000030349,0000002,*hRETRHLP                                         
000030392,0000002,*hCHKERRHLP                                       
000030426,0000002,*hGETCHHLP                                        
000030465,0000002,*hSTATOKHLP                                       
000030494,0000002,*hFILEQUAL                                        
000030531,0000002,*hFILUNEQUAL                                      
000030574,0000002,*hLOADFAILED                                      
000030613,0000002,*hTERMFAILED                                      
000030659,0000002,*hOWERWR                                          
000030696,0000002,*hMPADDDATE                                       
000030751,0000002,*hMPADDTIME                                       
000030806,0000002,*hNOPLCDATEHLP                                    
000030849,0000002,*hNOPLCTIMEHLP                                    
000030892,0000002,*hDELDATEHLP                                      
000030932,0000002,*hDELTIMEHLP                                      
000030972,0000003,*hPASSNAME                                        
000031044,0000005,*hPASSCONF                                        
000031193,0000004,*hPASSTIME                                        
000031332,0000004,*hPASSACK                                         
000031459,0000004,*hPASPRINT                                        
000031590,0000004,*hPASPAGE                                         
000031712,0000005,*hPASFROM                                         
000031864,0000005,*hPASTO                                           
000031996,0000002,*hLANCHHLP                                        
000032048,0000018,*hDISPDRIV                                        
000032603,0000002,*hTARMEM                                          
000032638,0000002,*hFONTNAME                                        
000032667,0000002,*hPLCTYPE                                         
000032693,0000002,*hSLAVEID                                         
000032723,0000002,*hKEYUPD                                          
000032763,0000002,*hTARCBAUD                                        
000032806,0000002,*hTARCPAR                                         
000032845,0000002,*hTARCSTOP                                        
000032888,0000002,*hTARCNOB                                         
000032935,0000002,*hTARTIME                                         
000032970,0000002,*hTARDATE                                         
000033005,0000002,*hTARPTYPE                                        
000033042,0000002,*hTARPWID                                         
000033084,0000002,*hTARPLEN                                         
000033127,0000002,*hTARALF                                          
000033165,0000002,*hTARPLF                                          
000033198,0000002,*hTARPROTO                                        
000033239,0000002,*hTARDCH                                          
000033286,0000002,*hTARDCON                                         
000033342,0000002,*hTARPBAUD                                        
000033388,0000002,*hTARPPAR                                         
000033430,0000002,*hTARPSTOP                                        
000033476,0000002,*hTARPNOB                                         
000033526,0000002,*hMEMMENU                                         
000033574,0000002,*hUSEFFMENU                                       
000033605,0000002,*hNRBITSMENU                                      
000033659,0000002,*hPROTOMENU                                       
000033713,0000002,*hDATECHMENU                                      
000033764,0000002,*hTIMECHMENU                                      
000033815,0000003,*hCOMPRHLP                                        
000033922,0000002,*hAUTOLFMENU                                      
000033972,0000002,*hPLCTYTPEMENU                                    
000034023,0000002,*hALARMHLP                                        
000034068,0000002,*hALARMHLP1                                       
000034102,0000003,*hALARMHLP2                                       
000034182,0000002,*hALARMHLP3                                       
000034214,0000002,*hALARMHLP5                                       
000034246,0000002,*hALARMHLP6                                       
000034278,0000002,*hALARMHLP7                                       
000034310,0000002,*hDB_TYPE                                         
000034339,0000002,*hDB_PLCOP                                        
000034370,0000002,*hDB_PLCAD                                        
000034400,0000002,*hDB_INDEX                                        
000034442,0000002,*hDB_MODE                                         
000034464,0000002,*hDB_FORMAT                                       
000034499,0000002,*hDB_BASE                                         
000034529,0000002,*hDB_MIN                                          
000034556,0000002,*hDB_MAX                                          
000034583,0000002,*hDB_LEN                                          
000034623,0000006,*hDB_PREC                                         
000034846,0000004,*hDB_HEIG                                         
000034946,0000002,*hDB_STI                                          
000034979,0000002,*hDB_A1                                           
000035012,0000002,*hDB_A2                                           
000035045,0000002,*hDB_B                                            
000035076,0000002,*hDISPCHOICE                                      
000035130,0000002,*hPLCOPCH                                         
000035179,0000002,*hDATAFORMCH                                      
000035230,0000002,*hNUMBASECH                                       
000035281,0000005,*hREADWRCH                                        
000035447,0000002,*hBITINDEXCH                                      
000035497,0000006,*hSTIEDITHLP                                      
000035722,0000002,*hSTIEDTXTHLP                                     
000035759,0000002,*hAT_TYPE                                         
000035792,0000002,*hAT_LENG                                         
000035826,0000002,*hAT_HEIG                                         
000035860,0000002,*hAT_PTYP                                         
000035896,0000002,*hAT_PLCO                                         
000035936,0000002,*hAT_ADDR                                         
000035975,0000002,*hAT_BLNK                                         
000036017,0000002,*hAT_HIGH                                         
000036063,0000002,*hAT_REVR                                         
000036107,0000002,*hATTTYCH                                         
000036158,0000002,*hWRONGPLC                                        
000036223,0000002,*hDWPROJ_YN                                       
000036280,0000002,*hMEMTYPE                                         
000036328,0000002,*hADVOPYN                                         
000036372,0000002,*hINTERNAL                                        
000036425,0000002,*hEXTERNAL                                        
000036478,0000002,*hFIRMWARE                                        
000036531,0000002,*hPROTOC                                          
000036568,0000002,*hPROJECT                                         
000036605,0000002,*hBOTH                                            
000036652,0000002,*hDELPROT                                         
000036687,0000002,*hDELPROT_ALERT                                   
000036750,0000002,*hEXTMEMLIST                                      
000036807,0000004,*hCREATEEPROM                                     
000036938,0000006,*hNOAPPLBIN                                       
000037143,0000003,*hCOMMFAILED                                      
000037223,0000002,*hNOPANMEM                                        
000037268,0000011,*hBADCHKS                                         
*HLP1
   Main menu: File 
Operations with project files stored on disc
*HLP2
   Main menu: Project 
Setup of global project parameters
*HLP3
   Main menu: Edit 
Cut,Copy & Paste pages and page rows
*HLP4
   Main menu: Simulate 
Simulate printer attached to panel
*HLP5
   Main menu: Transfer 
Transfer project to and from the panel
*HLP6
   Main menu: Options 
Communication Port, Color and Mouse Setup
*HLP7
   Main menu: Help 

The Designer Help system includes a help page
for each menu entry. You can activate the
help at any point in the program by pressing 
the F1 key. 
*HLP11
   File menu: Load 
Open project file on disc and load it in memory.

You can browse through the directories and select
the file you want to load.
OK - loads the file you have chosen.
CANCEL - will exit without loading 
Filename must be entered without extension.
*HLP12
   File menu: Save 
Save current project to disc file.
If the file is new, you will be asked
to give the name to the project file.
*HLP13
   File menu: Save as 
Save current project file under a different name
or give name to unnamed project and then save it.
*HLP14
   File menu: New
Delete current project and create a new one.
*HLP15
   File menu: Delete 
Delete project file on disc.
*HLP16
   File menu: Print summary

Print a short description of the project.

The short description includes:
- Panel/PLC setup information
- page statistics
*HLP17
   File menu: Print all

A complete printout includes:
- Panel/PLC setup information
- page statistics
- detailed page descriptions
*HLP18
   File menu: Print pages

Print the selected pages of the current project.
*HLP19
   File menu: Print alarms

Print alarm list.
*HLP1A
   File menu: Print variables

Prints all PLC variables used 
by the current project.
*HLP1B
   File menu: Printer setup

With the Printer setup dialog box you may 
configure the printer connected to your PC.

Print footer   select if you want a standard footer
               to be printed at the bottom of each page   
Page length    enter page length in lines 
Destination    select destination for printing.
               You can print to a parallel port or 
               to a file
Printer driver selecting one of the available printer
               drivers.

If a printer error has been detected while printing
from Designer, you may check for one of the 
following conditions:
- Printer is not connected
- Printer is powered off
- Printer is off-line or out of paper
*HLP1C
   File menu: OS shell
Temporarily exit to DOS. When ready to return back
to DOS Designer, type EXIT <ENTER> on DOS prompt.
*HLP1D
   File menu: Exit
Exit DOS Designer. If current project was modified,
you will be asked if you want to save it.
*HLP20
   Project menu: Panel setup

Using the Panel setup dialog box you may
configure Designer to work with your Panel.
 
The Options that can be configured are:

       - Type of Panel display
       - Character fonts
       - Size of Panel memory
       - PLC-specific parameters
       - Parameters for printing from Panel
*HLP21
   Project menu: Application name
A short comment (40 characters) describing the
application of your project.
*HLP22
   Project menu: Passwords
Enter passwords and set password options.
Password MUST be a 4 digit number. 
Password 7777 is reserved.
*HLP23
   Project menu: Alarms
Define the text and options for up to 256 alarms.
*HLP30
   Edit menu: Cut page

Delete current page and copy its content to the 
clipboard. The information written to the 
clipboard may be restored with the Paste page command.
*HLP31
   Edit menu: Copy page

Copy the current page to the clipboard.
You can then restore the page with the 
Edit/Paste page command. Use this command 
to create a duplicate of the current page.
*HLP32
   Edit menu: Paste page

Paste a page stored in the clipboard.
Clipboard must contain one page.
*HLP33
   Edit menu: Cut line
*HLP34
   Edit menu: Copy line
*HLP35
   Edit menu: Paste line
*HLP36
   Edit menu: Insert page

Insert an empty page at the position of the
current page; all pages that follow will be
renumbered.
The new page will be displayed.
*HLP37
   Edit menu: Add page

Add an empty page as the last page.
*HLP38
   Edit menu: Delete page

Delete current page. All data in this page
will be deleted.
Remaining pages will be renumbered.
*HLP39
   Edit menu: Insert line
*HLP3A
   Edit menu: Delete line
*HLP3B
   Edit menu: Goto page

Go to selected page.
You can select the page directly by entering 
the page number or by selecting it from the
list of pages.
*HLP3C
   Edit menu: Page options

The following page options can be set using
this dialog box:

- Name of the page: A 40 character string describing
                    the content of the page.
- Next page:        If "Y" is selected it will be possible
                    to change from this page to the next
                    using the right arrow key on panel.
- Previous page:    If "Y" is selected it will be possible
                    to change from this page to the previous
                    one using the left arrow key on panel.

Disabling page links will prevent users from moving to
other pages using the arrow keys on the panel.
*HLP3D
   Edit menu: Change mode
In Attribute Mode you can define the attribute of
the rectangular area of the screen. Numeric data
fields, bargraphs and text messages, defined in
Normal Mode, can overlap the attribute field.
*HLP43
   Simulate menu: Printer
*HLP51
   Transfer menu: Download

The current project file will be sent to
the panel through the serial link.
Panel must be in Configuration Mode to
receive the project.

If communication error is detected, 
download will be aborted. 
*HLP52
   Transfer menu: Upload

The project file from panel's memory
will be tranferred to DOS Designer. 
The current project will be removed from memory,
so it is recommended to save the project before
the upload operation. 
Panel must be in Configuration Mode 
in order to upload the project.

If communication error is detected 
upload will be aborted. 
*HLP53
   Transfer menu: Compare

This command will compare the project that is
currently in DOS Designer's memory with the project
that is present in the panel. The panel must be in 
Configuration Mode to communicate with a PC.
*HLP54
   Transfer menu: Check

Display the current panel resources.
The following information about panel 
is displayed:

       - Panel (PLC brand) type/code
       - Status of the project in panel
       - Display type
       - Memory size
       - External keyboard presence
       - Event list length

Panel must be in Configuration Mode to
communicate with DOS Designer.
*HLP55
   Transfer menu: Start

You can start the project that resides in panel
with this command. Upon receiving this command,
panel will switch from Configuration Mode
to Operation Mode.

Initially, panel must be in Configuration Mode to
communicate with DOS Designer.
*HLP56
   Transfer menu: Options
*HLP60
   Options menu: Communication
*HLP61
   Options menu: Colors
*HLP62
   Options menu: Colors schemes
*HLP63
   Options menu: Mouse settings
*HLP64
   Options menu: Language
*HLP70
   Help menu: Help index
*HLP71
   Help menu: Help on help
*HLP72
   Help menu: About
*hMPMEMORYLOW
    Low Memory !
We recommend that you save your project and exit from
DOS Designer. You can then try to free some memory by
deleting unused pages in the project or reorganizing
your project to use less pages.
*hMPSAVEFILE
    Error saving file
Your hard drive might be full. This error could be
due to disc controller or to internal program error.
*hMPSAVECLIP
    Error saving clipboard content
*hMPUPDATEINI
    Error updating configuraton file
*hMPREADLINECLIP
    Not enough memory to read line 
*hMPREADPAGECLIP
    Not enough memory to read page
*hMPREADELEMCLIP
    Not enough memory to read element
*hFNTALLHLP
    No fonts allowed for this display type
*hFNTCHHLP
    List of available fonts
*hDISCHHLP
    List of available display drivers
*hDELBGALLHLP
    Delete all bargraphs ?
*hCOMMMOUSEHLP
    Communicate using mouse port ?
*hERRHLP0
    Fatal error: No memory !
*hERRHLP1
    Fatal error: Read memory file !
*hERRHLP2
    Fatal error: Write memory file !
*hERRHLP3
    Fatal error: Can not free memory !
*hERRHLP4
    Fatal error: System error !
*hERRHLP5
    Error: Open file failed !
*hERRHLP6
    Error: Checkusum error !
*hERRHLP7
    Error: Read file failed !
*hERRHLP8
    Error: Write file failed !
*hERRHLP9
    Error: Wrong clipboard data !
*hPANICSAVEHLP
    Save project ?
*hNOMOUSEHLP
    Mouse driver is not installed
*hMOUSESETHLP
    Mouse setup dialog box
*hNOCHHLP
    Monochrome screen mode detected 
*hCHCOLHLP
    Items can change color
*hCHCHCHLP
    Available colors
*hSHELLNOMEMHLP
    No memory to exit to DOS
Temporary exit to DOS is possible only if
sufficient memory is available.
*hSHELLNOCOMMHLP
    Can not find COMMAND.COM
COMMAND.COM is DOS Command interpreter. It is
required to temporarily exit to DOS.
*hQUITSAVEHLP
    Quit without saving project ?
If you respond Yes, you will loose your latest
modifications of the project.
*hQUITHLP
    Do you really want to exit ?
*hCOLCOMBHLP
    List of available color schemes 
*hFMNAMEHLP
    File manager: File Name
*hFMFILEHLP
    File manager: File list
*hFMDIRHLP
    File manager: Directory list
*hNEWOKHLP
    New project !  Yes / No 
*hSAVEOVHLP
    Overwrite existing file ?
*hDELOKHLP
    Delete file ?
*hNOTIMPHLP
    Not implemented
This option is reserved for future enhancements.
*hPAGEASKNAMEHLP
    List of available pages 
*hDELELEMHLP
    Delete field ?
*hYESNOHLP
    Yes or No ?
*hINSDELHLP
    Insert will delete line containing fields !
*hPREVHLP
    Page options: Previous page
*hNEXTHLP
    Page options: Next page
*hNAMEHLP
    Page options: Page Name
*hOKHELP
    OK button
Confirm your choices.  
*hCANCELHELP
    CANCEL button
Cancel any changes.
*hPAGENUM
    Goto page: page number
*hMPADDPAGE
    Not enough memory to add page !
*hPAGEADDMSHLP
    Page added  
*hPAGEDELHLP
    Do you really want to delete page ?
*hPAGEINSMHLP
    Page inserted 
*hMPINSPAGE
    Not enough memory to insert page !
*hNODATEEDHLP
    DATE field can not be edited
*hNOTIMEEDHLP
    TIME field can not be edited
*hMAINPAGEHLP
    Page editor     
Type in the text or press ENTER to define
PLC data field.   
*hDBMENU
    Define Field
*hDATMENU
    Define Date
*hTIMMENU
    Define Time
*hPUTMNU
    Paste Field
*hTXTMNU
    Special character
*hATTMENU
    Define Attribute
*hEDITMNU
     Edit Field
*hDELMNU
     Delete Field
*hCUTMNU
     Cut Field
*hCOPMNU
     Copy Field
*hCOMHLP1
     Communication Port
*hCOMHLP2
     Baud rate
*hCOMHLP3
     Parity 
*hCOMHLP4
     Stop bits
*hMOUSECOMHLP
     You have chosen COM port used by mouse
*hCOMPORTHLP
     Available COM ports
*hNROFSTHLP
     Number of stop bits
*hPARITYHLP
     Choice of parity
*hBAUDHLP
     Available baud rates
*hHLPOFHLP
     Help on help
*hPRINTPAUSE
     Printing paused
*hPRINTERR
     Printer is in error state
*hPRINTTERM
     Terminate printing ?
*hAPLNAME
     Application name
*hLPTCHHLP
     List of available LPTs and FILE
*hPRFOOT
     Print footer ?
*hPRLENGT
     Printout page length
*hPRDEST
     Printer destination
*hPRDRIV
     Printer driver
*hPRFROM
     Print from page
*hPRTOPAG
     Print to page
*hPRNCHHLP
     Available printer drivers
*hCHOSEDESTHLP
     Memory destination in Panel
*hWRONGDISHLP
     Wrong display type !
*hWRONGMEMHLP
     Wrong memory size !
*hRETRHLP
     Too many retransmissions 
*hCHKERRHLP
     Checksum error
*hGETCHHLP
     Get Panel parameters
*hSTATOKHLP
     Status OK
*hFILEQUAL
     Projects are equal
*hFILUNEQUAL
     Projects are not equal
*hLOADFAILED
     Load file failed !
*hTERMFAILED
     Project file is corrupted
*hOWERWR
     Overwrite existing ?
*hMPADDDATE
     Not enough memory to add DATE field
*hMPADDTIME
     Not enough memory to add TIME field
*hNOPLCDATEHLP
     No space to add DATE
*hNOPLCTIMEHLP
     No space to add TIME
*hDELDATEHLP
     Delete DATE field ?
*hDELTIMEHLP
     Delete TIME field ?
*hPASSNAME
     Password "NNNN" ( N = 0-9 )
You must enter 4 digits.
*hPASSCONF
     Password config flag
Operator using this password will be allowed (y) or
prohibited (n) to put the panel in Configuration
Mode.
*hPASSTIME
     Password time flag
Operator using this password will be allowed (y) or
prohibited (n) to change the time on the panel.
*hPASSACK
     Password ack flag
Operator using this password will be allowed (y) or
prohibited (n) to acknowledge alarms.
*hPASPRINT
     Password print flag
Operator using this password will be allowed (y) or
prohibited (n) to issue print command.
*hPASPAGE
     Password page flag
Operator using this password will be allowed (y) or
prohibited (n) to change pages.
*hPASFROM
     Passwords - from page
This password allows the operator to input
data starting from the page number that 
you enter in this field. 
*hPASTO
     Passwords - to page
This password allows the operator to input
data up to the page number entered in this
field. 
*hLANCHHLP
     List of available language files 
*hDISPDRIV
     Panel display

Select the display type you are going to use.
The display dimensions will be visible from
the page editor. 

Note: You will not be able to download a project
      to Panel if an incorrect display type has 
      been selected.

You can change the display type used by an existing
project. However, if you change the display type to
a display with less columns, the background text 
will be clipped on the right side and you may loose
some data. 
In this case, Designer will ask you to confirm
the change.
*hTARMEM
     Panel memory model
*hFONTNAME
     Panel font
*hPLCTYPE
     PLC type
*hSLAVEID
     Slave number
*hKEYUPD
     Keyboard update address
*hTARCBAUD
     Panel<---->PLC Baud rate
*hTARCPAR
     Panel<---->PLC parity
*hTARCSTOP
     Panel<---->PLC stop bits
*hTARCNOB
     Panel<---->PLC number of bits
*hTARTIME
     Panel Time format
*hTARDATE
     Panel Date format
*hTARPTYPE
     Panel printer type
*hTARPWID
     Panel printer page width
*hTARPLEN
     Panel printer page length
*hTARALF
     Panel printer auto LF
*hTARPLF
     Panel printer LF
*hTARPROTO
     Panel printer protocol
*hTARDCH
     Panel printer delay after char
*hTARDCON
     Panel printer delay after control char
*hTARPBAUD
     Panel<--->Printer baud rate
*hTARPPAR
     Panel<--->Printer parity
*hTARPSTOP
     Panel<--->Printer stop bits
*hTARPNOB
     Panel<--->Printer number of bits
*hMEMMENU
     List of available memory sizes
*hUSEFFMENU
     Use FF list
*hNRBITSMENU
     List of available number of bits 
*hPROTOMENU
     List of available printer protocol
*hDATECHMENU
     List of available Date formats
*hTIMECHMENU
     List of available Time formats
*hCOMPRHLP
     Switching to the Panel with narrower screen
can result in the loss of some data fields.
*hAUTOLFMENU
     List of available LF choices 
*hPLCTYTPEMENU
     List of available PLC models
*hALARMHLP
     Global help for alarm form
*hALARMHLP1
     Alarm priority
*hALARMHLP2
     Alarm text
Type the text you want to appear with the alarm.
*hALARMHLP3
     Alarm flag 1
*hALARMHLP5
     Alarm flag 2
*hALARMHLP6
     Alarm flag 3
*hALARMHLP7
     Alarm flag 4
*hDB_TYPE
     Data format
*hDB_PLCOP
     PLC Operator
*hDB_PLCAD
     PLC Address
*hDB_INDEX
     PLC Address - bit index
*hDB_MODE
     Mode
*hDB_FORMAT
     Variable format
*hDB_BASE
     Numeric base
*hDB_MIN
     Min values
*hDB_MAX
     Max values
*hDB_LEN
     Width of variable field
*hDB_PREC
     Fixed point precision
A number indicating the placement of the decimal 
point. Precision 1 will display one digit following
the decimal point. This number MUST be less than the
width of the data field.
*hDB_HEIG
     Height of variable field
Bargraph and attribute fields can be higher
than 1 row.
*hDB_STI
     Messages strings
*hDB_A1
     Scaling factor A1
*hDB_A2
     Scaling factor A2
*hDB_B
     Scaling factor B
*hDISPCHOICE
     List of available display formats
*hPLCOPCH
     List of available PLC operators
*hDATAFORMCH
     List of available data formats
*hNUMBASECH
     List of available numeric bases
*hREADWRCH
     List of available access modes
Read Only or Read/Write access mode. For some types
of PLC operators Read Only is the only mode that is
allowed. 
*hBITINDEXCH
     List of available bit indexes
*hSTIEDITHLP
     Message form - general help
You can associate a separate text message with each
value of the PLC variable, in the defined range of
values. No more than 250 messages can be defined 
for a single field.
*hSTIEDTXTHLP
     Message string 
*hAT_TYPE
     Attribute type 
*hAT_LENG
     Attribute length
*hAT_HEIG
     Attribute height
*hAT_PTYP
     Attribute PLC type
*hAT_PLCO
     Attribute PLC operator
*hAT_ADDR
     Attribute PLC address
*hAT_BLNK
     Attribute static - BLINK
*hAT_HIGH
     Attribute static - HIGHLIGHT
*hAT_REVR
     Attribute static - REVERSE
*hATTTYCH
     List of available attribute types
*hWRONGPLC
     You are loading a project for a different PLC 
*hDWPROJ_YN
     Download project to external memory ?
*hMEMTYPE
     What type of external memory ?
*hADVOPYN
     Advanced options enabled ?
*hINTERNAL
     Send Protocol to internal memory ?
*hEXTERNAL
     Send Protocol to external memory ?
*hFIRMWARE
     Send Protocol to firmware memory ?
*hPROTOC
     Send Protocol only ?
*hPROJECT
     Send Project only ?
*hBOTH
     Send both (Project & Protocol) ?
*hDELPROT
     Delete Protocol ?
*hDELPROT_ALERT
     Do you really want to delete Protocol ?
*hEXTMEMLIST
     List of available external memories 
*hCREATEEPROM
     Create EPROM file
Creates a binary file that can be burned  in
EPROM and installed in external memory chip.
*hNOAPPLBIN
     Can not find Protocol binary file 
DOS Designer with the support for the
downloadable protocols comes with the
separate Protocol binary file.
     This file is missing or corrupted.
*hCOMMFAILED
     Communication errors
Check your cable & COM port settings.
*hNOPANMEM
     Not enough memory in Panel
*hBADCHKS
     Project has bad checksum
Bad checksum can mean several things  :  
  A) There is no project in panel memory
  B) For some reason (ex. cancelled 
     download) project in panel memory
     is corrupted
  C) Batteries are low or not installed
  D) Communication line is noisy and
     downloaded project contains errors

